Introduction to the mypack package

Calling sequence:

functions (args)
mypack [function] (args)

Parameters: x, y - 2 real numbers

Decription:

To use a mypack function, either define that function 
alone using the command with(mypack, function), or define 
all mypack functions using the command with(mypack). 
Alternatively, invoke the function using the long form 
mypack[function]. This long form notation is necessary
whenever there is a conflict between a package function 
name and another function used in the same session.


The functions are:

tothe2
tothe3
cuberoot
times
